SA 113

RA = 21:41:09 DEC = 00:23:00 (2000.0)

V B-V U-B V-R R-I V-I 233 12.398 0.549 0.096 0.338 0.322 0.661 239 13.038 0.516 0.051 0.318 0.327 0.647 241 14.352 1.344 1.452 0.897 0.797 1.683 245 15.665 0.628 0.112 0.396 0.318 0.716