PG 1323-086

RA = 13:25:52 DEC = -08:49:57 (2000.0)

V B-V U-B V-R R-I V-I PG 1323-086 13.481 -0.140 -0.681 -0.048 -0.078 -0.127 A 13.591 0.393 -0.019 0.252 0.252 0.506 B 13.406 0.761 0.265 0.426 0.407 0.833 C 14.003 0.707 0.245 0.395 0.363 0.759 D 12.080 0.587 0.005 0.346 0.335 0.684