Time (secs. from midnight UT on July 18)

Ratio of flux-plume/flux-Jupiter (disk-integrated)

70500 71000 71500 72000

0.0 0.05 0.10 0.15

Impact H light curve. Filter 9.10-10.41 micron. Resolution 3.5 secs.